Environment

Measurement

Method

ManMaterial

Machine

Operator

Temperature

Speed ofLight

Time of day

Distinctiveness of figure

Time of yearNumber of observations

Calibration of tuning forks

Position ofslitWeather conditions industries toNearness pressure

Airofmirrors

Number

Area

Vibrations

Pathdirection

Distance forkaccuracy

Tuning

Duration

Maintenance procedures

Speed of rotation inbathPosition ofimage ofAngle mirrors onsurface

Dirtonmirrors

Type ofrecepticle

Instrument light source

Type of

Stability of floating apparatus.